/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 50532
Source Host           : localhost:3306
Source Database       : openerp

Target Server Type    : MYSQL
Target Server Version : 50532
File Encoding         : 65001

Date: 2013-07-19 16:30:19
*/

SET FOREIGN_KEY_CHECKS=0;
-- ----------------------------
-- Table structure for `roles`
-- ----------------------------
DROP TABLE IF EXISTS `roles`;
CREATE TABLE `roles` (
  `SEQ` int(11) NOT NULL,
  `ROLE_CODE` varchar(45) NOT NULL,
  `ROLE_NAME_KOR` varchar(45) NOT NULL,
  `ROLE_NAME_ENG` varchar(45) DEFAULT NULL,
  `DESCRIPTION` varchar(45) DEFAULT NULL,
  `CREATE_DATE` varchar(45) DEFAULT NULL,
  `UPDATE_DATE` varchar(45) DEFAULT NULL,
  PRIMARY KEY (`SEQ`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- ----------------------------
-- Records of roles
-- ----------------------------
INSERT INTO `roles` VALUES ('1', 'GUEST', '방문자', 'GUEST', '테스트', null, null);
